\pagestyle{empty}

\begin{center}

\vspace*{1.0cm}
\Huge
{\bf \program{WD-pic} \\ 
\LARGE
User's Manual}

\vspace*{1.0cm}
\normalsize
by \\
\vspace*{1.0cm}
\Large
Lihua Ou\\
\normalsize
\vspace*{3.0cm}
August 2002

\end{center}
\newpage

\pagenumbering{roman}
\setcounter{page}{2}
\tableofcontents
\listoffigures
\newpage

\pagenumbering{arabic}
